python quiver_memleak.py 575,018,704,516 bytes x ms

ms 0.0 5000.0 10000.0 15000.0 20000.0 25000.0 bytes

0M

2M

4M

6M

8M

10M

12M

14M

16M

18M

20M

x57FC71D:agg::rasterizer x80A30B5:type_new x8101751:PyGrammar_AddAc x80707BC:float_sub x808D888:string_concat x56ABEFA:TclpRealloc x5899606:_XimParseString x80EE9BF:_PyObject_GC_Ma x80938AB:PyString_Format other x80EEB3F:_PyObject_GC_Ne heap-admin x8073247:PyInt_FromLong x808F40D:PyString_FromSt x56ABEAD:TclpAlloc x5834A4D:RendererAgg::Re x8082612:dictresize x8088D14:PyObject_Malloc