python memleak2.py 27,061,979,799 bytes x ms

ms 0.0 500.0 1000.0 1500.0 2000.0 2500.0 3000.0 3500.0 4000.0 4500.0 bytes

0M

2M

4M

6M

8M

xBDA761:_dl_new_object x80938AB:PyString_Format x808F20D:PyString_FromSt x80A30B5:type_new heap-admin x8101751:PyGrammar_AddAc stack(s) x80EEB3F:_PyObject_GC_Ne x80EE9BF:_PyObject_GC_Ma x8073247:PyInt_FromLong x808F40D:PyString_FromSt x8082612:dictresize x8088D14:PyObject_Malloc